E_ν (MeV)

(see annotations)

(a)

(b) (c) a) ν^__e interactions in detector Μ1/(day MeV)Ν b) ν^__e flux at detector Μ10^8/(s MeV cm^2)Ν c) σ(E_ν) Μ10^{-43} cm^2Ν

0 10 20 30 40 50 60 70 80 90

2 3 4 5 6 7 8 9 10