Muons in radon (Rn)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 86 (Rn) [222.01758(2)]9.066 × 10^{−3} 794.0 0.20798 2.7409 1.5368 4.9889 13.2839 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.782 3.782 1.535 × 10^0 14.0 MeV 5.616 × 10^1 3.018 3.018 2.730 × 10^0 20.0 MeV 6.802 × 10^1 2.405 2.405 4.980 × 10^0 30.0 MeV 8.509 × 10^1 1.902 1.902 9.715 × 10^0 40.0 MeV 1.003 × 10^2 1.644 1.644 1.540 × 10^1 80.0 MeV 1.527 × 10^2 1.267 1.267 4.394 × 10^1 100. MeV 1.764 × 10^2 1.201 1.201 6.019 × 10^1 140. MeV 2.218 × 10^2 1.140 1.140 9.452 × 10^1 200. MeV 2.868 × 10^2 1.116 1.117 1.479 × 10^2 216. MeV 3.039 × 10^2 1.116 1.116 Minimum ionization 300. MeV 3.917 × 10^2 1.127 0.000 0.000 1.128 2.372 × 10^2 400. MeV 4.945 × 10^2 1.154 0.000 0.000 1.154 3.249 × 10^2 800. MeV 8.995 × 10^2 1.258 0.001 0.000 1.260 6.559 × 10^2 1.00 GeV 1.101 × 10^3 1.300 0.001 0.000 1.302 8.119 × 10^2 1.40 GeV 1.502 × 10^3 1.367 0.002 0.001 1.371 1.111 × 10^3 2.00 GeV 2.103 × 10^3 1.443 0.004 0.001 0.001 1.449 1.536 × 10^3 3.00 GeV 3.104 × 10^3 1.531 0.007 0.003 0.001 1.543 2.204 × 10^3 4.00 GeV 4.104 × 10^3 1.595 0.010 0.006 0.002 1.614 2.837 × 10^3 8.00 GeV 8.105 × 10^3 1.745 0.026 0.022 0.003 1.796 5.173 × 10^3 10.0 GeV 1.011 × 10^4 1.790 0.034 0.031 0.004 1.860 6.267 × 10^3 14.0 GeV 1.411 × 10^4 1.855 0.052 0.051 0.005 1.964 8.357 × 10^3 20.0 GeV 2.011 × 10^4 1.920 0.081 0.085 0.007 2.094 1.131 × 10^4 30.0 GeV 3.011 × 10^4 1.989 0.132 0.149 0.011 2.282 1.588 × 10^4 40.0 GeV 4.011 × 10^4 2.035 0.187 0.221 0.014 2.457 2.010 × 10^4 80.0 GeV 8.011 × 10^4 2.135 0.422 0.535 0.028 3.121 3.450 × 10^4 100. GeV 1.001 × 10^5 2.165 0.547 0.704 0.034 3.452 4.059 × 10^4 140. GeV 1.401 × 10^5 2.208 0.804 1.053 0.048 4.114 5.119 × 10^4 160. GeV 1.602 × 10^5 2.224 0.936 1.235 0.054 4.450 Muon critical energy 200. GeV 2.001 × 10^5 2.251 1.204 1.606 0.068 5.131 6.423 × 10^4 300. GeV 3.001 × 10^5 2.297 1.888 2.530 0.102 6.817 8.110 × 10^4 400. GeV 4.001 × 10^5 2.328 2.594 3.487 0.136 8.545 9.418 × 10^4 800. GeV 8.001 × 10^5 2.399 5.506 7.409 0.274 15.590 1.283 × 10^5 1.00 TeV 1.000 × 10^6 2.420 7.001 9.415 0.344 19.183 1.399 × 10^5 1.40 TeV 1.400 × 10^6 2.452 9.996 13.415 0.487 26.353 1.576 × 10^5 2.00 TeV 2.000 × 10^6 2.485 14.573 19.519 0.705 37.285 1.767 × 10^5 3.00 TeV 3.000 × 10^6 2.522 22.211 29.661 1.077 55.473 1.985 × 10^5 4.00 TeV 4.000 × 10^6 2.547 29.946 39.909 1.455 73.860 2.141 × 10^5 8.00 TeV 8.000 × 10^6 2.609 61.114 81.099 3.021 147.844 2.516 × 10^5 10.0 TeV 1.000 × 10^7 2.628 76.812 101.800 3.825 185.067 2.637 × 10^5 14.0 TeV 1.400 × 10^7 2.659 108.123 143.108 5.473 259.364 2.819 × 10^5 20.0 TeV 2.000 × 10^7 2.691 155.348 205.330 7.998 371.369 3.011 × 10^5 30.0 TeV 3.000 × 10^7 2.729 233.967 308.849 12.357 557.903 3.229 × 10^5 40.0 TeV 4.000 × 10^7 2.756 312.850 412.606 16.816 745.030 3.384 × 10^5 80.0 TeV 8.000 × 10^7 2.822 628.791 827.918 35.424 1494.957 3.755 × 10^5 100. TeV 1.000 × 10^8 2.844 787.000 1035.760 45.030 1870.636 3.875 × 10^5