\tenpoint
\nopagenumbers
\singlespace
\def\sub#1{$_{\bf#1}$}
\def\b{\phantom{0}}
\def\dashfill{\leaders\hrule                              height2.5pt depth-2pt\hfill}
\vbox{
\vskip0.3in
\vbox{\centerline{$b(E)\times10^6$ [cm$^2$g$^{-1}$] for}
\centerline{%
soft tissue (ICRP)}
\centerline{%
 $\langle Z/A\rangle = $ 0.55121}
\vskip0.03in
{\advance\baselineskip-3pt
\centerline{\vbox{\halign{
&\hbox to 0.55in{\hss\ #}
&\hbox to 0.5in{\hskip0.2in\hss#}
&\hbox to 0.5in{\hss#}
&\hbox to 0.5in{\hss#}
&\hbox to 0.5in{\hss#} \cr
\noalign{\hrule\vskip2pt\hrule\smallskip}
E [GeV]&$b_{\rm brems}$&$b_{\rm pair}\ $
&$b_{\rm nucl}\ $ &$b_{\rm tot}\ $\cr
\noalign{\smallskip\hrule\smallskip}
       2. &  0.2765 &  0.1212 &  0.4714 &  0.8691\cr
       5. &  0.3752 &  0.2996 &  0.4988 &  1.1737\cr
      10. &  0.4569 &  0.4533 &  0.4838 &  1.3940\cr
      20. &  0.5430 &  0.6206 &  0.4614 &  1.6250\cr
      50. &  0.6604 &  0.8559 &  0.4369 &  1.9532\cr
     100. &  0.7479 &  1.0224 &  0.4249 &  2.1951\cr
     200. &  0.8312 &  1.1757 &  0.4187 &  2.4257\cr
     500. &  0.9297 &  1.3335 &  0.4178 &  2.6811\cr
    1000. &  0.9929 &  1.4302 &  0.4245 &  2.8476\cr
    2000. &  1.0455 &  1.4983 &  0.4359 &  2.9796\cr
    5000. &  1.0981 &  1.5584 &  0.4571 &  3.1136\cr
   10000. &  1.1262 &  1.5867 &  0.4786 &  3.1916\cr
   20000. &  1.1460 &  1.6047 &  0.5040 &  3.2547\cr
   50000. &  1.1632 &  1.6188 &  0.5437 &  3.3256\cr
  100000. &  1.1712 &  1.6245 &  0.5777 &  3.3736\cr
\noalign{\smallskip\hrule\vskip2pt\hrule\smallskip}
 }}}}}
 } \bye

