) [GeV] l ~ m( 100 150 200 250 300 350

) [GeV] 0 1χ∼ m(

0

50

100

150

200

250

)^0_1χ∼

)= m( ± l ~ m(

) theory

SUSY σ1± Observed limit (

)_{exp} σ± Expected limit (

excluded Rμ∼ LEP

ATLASPreliminary

=8 TeV s, ^{-1}

L dt = 20.3 fb ∫ 0_1χ∼ ^- l^0_1χ∼ ^+ l→^-_Ll ~ +_Ll ~

)

All limits at 95% CL