)μ Best fit signal strength (

Combined γγ→H llll

→ ^{(*)} ZZ →H νlν l→ ^{(*)} WW →H ττ→H bb → W,Z H

= 125.5 GeV Hm

-0.18

+0.21

= 1.33 μ

-0.28

+0.33

= 1.55 μ -0.35

+0.40

= 1.43 μ -0.28

+0.31

= 0.99 μ -0.4

+0.5

= 1.4 μ 0.7 ± = 0.2 μ

A1

A1 A1 A1 A2* A3*

* ATLAS Preliminary not in combination ** CMS Preliminary not in combination

0.14 C1 ± = 0.80 μ

0.27 C1 ± = 0.77 μ 0.28 C1 ± = 0.92 μ 0.20 C1 ± = 0.68 μ

0.41 C1 ± = 1.10 μ 0.29 C6** ± = 0.87 μ

0.62 C1 ± = 1.15 μ

ATLAS CMS Prel. -1 4.8 fb ≤ Ldt∫

= 7 TeV:

s^{-1} 5.1 fb≤Ldt∫ = 7 TeV: s -1 20.7 fb ≤ Ldt∫

= 8 TeV:

s^{-1} 19.6 fb≤Ldt∫ = 8 TeV: s = 125.5 GeV

Hm = 125.7 GeV Hm

-1 0 1 2 -1 0 1 2