)^{-1} s^{-2} cm^6 10

× (_eϕ

0 0.5 1 1.5 2 2.5 3 3.5

)^{-1} s^{-2} cm^6 10 × (_{τμ}ϕ

0

1 2 3

4 5 6

68% C.L. CC SNO ϕ 68% C.L. NC SNO ϕ 68% C.L. ES SNO ϕ 68% C.L. ES SKϕ

68% C.L. SSM BS05 ϕ 68%, 95%, 99% C.L. τμ NCϕ