Events / GeV

0

100

200

300 MINOS Far Detector Fully reconstructed events

Data No oscillations Best oscillation fit Neutral current background

Reconstructed neutrino energy (GeV)

Ratio to no oscillations

0

0.5

1

0 5 10 15 20 30 50

Data/Monte Carlo ratio Best oscillation fit Best decay fit Best decoherence fit