]^2

[GeV/c

TEll- Tm 0 50 100 150 200 250

2 events / 10 GeV/c

0

50

100

150

200

250 data =125 GeV H m H125 W+jets VV Top *γ Z/ WW

syst. ⊕ stat.

CMS Preliminary -1 = 8 TeV, L = 19.5 fb s -1 = 7 TeV, L = 4.9 fb s μ 0-jet e

]^2

[GeV/c

TEll- Tm 0 50 100 150 200 250 data / MC

0 0.5 1 1.5 2 2.5