[GeV] 4lm 80 100 120 140 160 180

Events / 3 GeV

0 5 10 15 20 25 30 35 Data Z+X ,ZZ *γZ =126 GeV Hm

CMS Preliminary^{-1}

= 8 TeV, L = 19.6 fb s ; ^{-1}

= 7 TeV, L = 5.1 fb s