Table 314: b(E) × 10^6 [cm^2g^{−1}] for Darmstadtium, Z =110, A =[281.162(5)]

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 2.5969 0.0288 0.3536 2.9794 5. 3.6159 2.0675 0.3775 6.0609 10. 4.4493 3.6596 0.3702 8.4791 20. 5.3045 5.0920 0.3525 10.7490 50. 6.4205 7.3144 0.3427 14.0776 100. 7.2109 8.7711 0.3358 16.3177 200. 7.9283 10.0530 0.3326 18.3139 500. 8.7274 11.2189 0.3328 20.2791 1000. 9.2043 11.8321 0.3379 21.3744 2000. 9.5721 12.2718 0.3460 22.1899 5000. 9.9101 12.6380 0.3606 22.9087 10000. 10.0759 12.8060 0.3752 23.2570 20000. 10.1850 12.9157 0.3921 23.4928 50000. 10.2822 12.9964 0.4186 23.6972 100000. 10.3140 13.0302 0.4413 23.7855