Table 147: b(E) × 10^6 [cm^2g^{−1}] for Dichlorodiethyl ether C_4Cl_2H_8O

⟨Z/A⟩ = 0.51744

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.4134 0.1899 0.4531 1.0564 5. 0.5620 0.4669 0.4806 1.5095 10. 0.6835 0.6942 0.4672 1.8450 20. 0.8102 0.9364 0.4466 2.1932 50. 0.9799 1.2801 0.4239 2.6840 100. 1.1047 1.5197 0.4128 3.0372 200. 1.2217 1.7409 0.4073 3.3698 500. 1.3588 1.9590 0.4066 3.7243 1000. 1.4454 2.0840 0.4131 3.9426 2000. 1.5161 2.1752 0.4240 4.1153 5000. 1.5854 2.2538 0.4443 4.2836 10000. 1.6217 2.2909 0.4647 4.3773 20000. 1.6474 2.3143 0.4887 4.4505 50000. 1.6683 2.3331 0.5263 4.5276 100000. 1.6782 2.3407 0.5584 4.5773