Table 120: b(E) × 10^6 [cm^2g^{−1}] for Cortical bone (ICRP)

⟨Z/A⟩ = 0.52130

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3987 0.1816 0.4553 1.0357 5. 0.5417 0.4471 0.4830 1.4717 10. 0.6587 0.6657 0.4694 1.7938 20. 0.7807 0.8993 0.4486 2.1286 50. 0.9444 1.2305 0.4257 2.6006 100. 1.0646 1.4618 0.4145 2.9410 200. 1.1781 1.6731 0.4089 3.2601 500. 1.3106 1.8861 0.4081 3.6049 1000. 1.3945 2.0091 0.4147 3.8183 2000. 1.4631 2.0975 0.4257 3.9863 5000. 1.5305 2.1741 0.4461 4.1507 10000. 1.5657 2.2102 0.4667 4.2427 20000. 1.5906 2.2333 0.4909 4.3147 50000. 1.6111 2.2513 0.5287 4.3910 100000. 1.6208 2.2588 0.5611 4.4407