Table 075: b(E) × 10^6 [cm^2g^{−1}] for Rhenium, Z = 75, A =186.207(1)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.8307 0.4713 0.3667 2.6686 5. 2.5366 1.8861 0.3916 4.8143 10. 3.1125 2.9839 0.3839 6.4803 20. 3.7034 4.0103 0.3654 8.0790 50. 4.4768 5.5686 0.3549 10.4003 100. 5.0269 6.5994 0.3477 11.9739 200. 5.5293 7.5143 0.3443 13.3878 500. 6.0935 8.3536 0.3444 14.7916 1000. 6.4336 8.7986 0.3498 15.5820 2000. 6.6984 9.1197 0.3582 16.1763 5000. 6.9441 9.3882 0.3736 16.7059 10000. 7.0659 9.5123 0.3889 16.9670 20000. 7.1466 9.5932 0.4067 17.1465 50000. 7.2133 9.6535 0.4345 17.3013 100000. 7.2429 9.6785 0.4582 17.3797