Table 048: b(E) × 10^6 [cm^2g^{−1}] for Cadmium, Z = 48, A =112.411(8)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3098 0.5347 0.3849 2.2294 5. 1.8033 1.5133 0.4113 3.7279 10. 2.2047 2.2723 0.3934 4.8703 20. 2.6165 3.0106 0.3826 6.0097 50. 3.1574 4.1106 0.3715 7.6395 100. 3.5441 4.8465 0.3635 8.7541 200. 3.8997 5.5065 0.3597 9.7658 500. 4.3030 6.1190 0.3597 10.7817 1000. 4.5488 6.4472 0.3654 11.3613 2000. 4.7421 6.6857 0.3744 11.8022 5000. 4.9239 6.8861 0.3908 12.2007 10000. 5.0149 6.9793 0.4072 12.4015 20000. 5.0758 7.0401 0.4262 12.5422 50000. 5.1265 7.0859 0.4559 12.6683 100000. 5.1494 7.1050 0.4813 12.7357