Table 024: b(E) × 10^6 [cm^2g^{−1}] for Chromium, Z = 24, A =51.9961(6)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.7665 0.3624 0.4141 1.5429 5. 1.0462 0.9015 0.4417 2.3895 10. 1.2733 1.3255 0.4317 3.0305 20. 1.5069 1.7595 0.4147 3.6811 50. 1.8163 2.3931 0.3957 4.6052 100. 2.0395 2.8241 0.3865 5.2501 200. 2.2470 3.2187 0.3820 5.8477 500. 2.4860 3.5926 0.3818 6.4604 1000. 2.6342 3.7967 0.3879 6.8188 2000. 2.7527 3.9467 0.3977 7.0972 5000. 2.8663 4.0737 0.4158 7.3559 10000. 2.9243 4.1333 0.4340 7.4916 20000. 2.9636 4.1721 0.4551 7.5908 50000. 2.9967 4.2016 0.4881 7.6864 100000. 3.0119 4.2140 0.5163 7.7422