Table 007: b(E) × 10^6 [cm^2g^{−1}] for Nitrogen gas (N_2), Z = 7, A =14.0067(2)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2778 0.1222 0.4645 0.8646 5. 0.3764 0.3008 0.4917 1.1689 10. 0.4576 0.4529 0.4773 1.3878 20. 0.5430 0.6188 0.4557 1.6176 50. 0.6589 0.8523 0.4322 1.9433 100. 0.7448 1.0176 0.4207 2.1831 200. 0.8269 1.1699 0.4149 2.4117 500. 0.9234 1.3260 0.4140 2.6635 1000. 0.9852 1.4215 0.4209 2.8276 2000. 1.0363 1.4884 0.4322 2.9568 5000. 1.0870 1.5473 0.4531 3.0875 10000. 1.1138 1.5752 0.4743 3.1633 20000. 1.1325 1.5928 0.4991 3.2245 50000. 1.1485 1.6067 0.5381 3.2933 100000. 1.1561 1.6124 0.5715 3.3401