Table 251: Muons in Sodium carbonate (Na_2CO_3)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.49062 2.532 125.0 0.08715 3.5638 0.1287 2.8591 3.7178 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.575 6.575 8.449 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.142 5.142 1.540 × 10^0 20.0 MeV 6.802 × 10^1 4.026 4.026 2.874 × 10^0 30.0 MeV 8.509 × 10^1 3.131 3.131 5.729 × 10^0 40.0 MeV 1.003 × 10^2 2.679 2.679 9.204 × 10^0 80.0 MeV 1.527 × 10^2 2.017 2.017 2.695 × 10^1 100. MeV 1.764 × 10^2 1.895 1.895 3.721 × 10^1 140. MeV 2.218 × 10^2 1.771 1.772 5.914 × 10^1 200. MeV 2.868 × 10^2 1.703 1.703 9.381 × 10^1 298. MeV 3.894 × 10^2 1.681 0.000 1.681 Minimum ionization 300. MeV 3.917 × 10^2 1.681 0.000 1.681 1.531 × 10^2 400. MeV 4.945 × 10^2 1.690 0.000 1.691 2.125 × 10^2 800. MeV 8.995 × 10^2 1.764 0.000 0.000 1.764 4.440 × 10^2 1.00 GeV 1.101 × 10^3 1.796 0.000 0.000 1.797 5.563 × 10^2 1.40 GeV 1.502 × 10^3 1.847 0.000 0.000 0.001 1.848 7.757 × 10^2 2.00 GeV 2.103 × 10^3 1.903 0.001 0.000 0.001 1.905 1.095 × 10^3 3.00 GeV 3.104 × 10^3 1.967 0.001 0.001 0.001 1.971 1.611 × 10^3 4.00 GeV 4.104 × 10^3 2.011 0.002 0.001 0.002 2.016 2.112 × 10^3 8.00 GeV 8.105 × 10^3 2.111 0.004 0.004 0.004 2.124 4.039 × 10^3 10.0 GeV 1.011 × 10^4 2.142 0.006 0.006 0.005 2.158 4.973 × 10^3 14.0 GeV 1.411 × 10^4 2.185 0.009 0.009 0.006 2.210 6.804 × 10^3 20.0 GeV 2.011 × 10^4 2.230 0.013 0.015 0.009 2.268 9.482 × 10^3 30.0 GeV 3.011 × 10^4 2.277 0.022 0.027 0.013 2.339 1.382 × 10^4 40.0 GeV 4.011 × 10^4 2.310 0.031 0.039 0.017 2.397 1.804 × 10^4 80.0 GeV 8.011 × 10^4 2.384 0.070 0.095 0.033 2.582 3.409 × 10^4 100. GeV 1.001 × 10^5 2.407 0.091 0.125 0.041 2.664 4.172 × 10^4 140. GeV 1.401 × 10^5 2.441 0.134 0.187 0.058 2.820 5.631 × 10^4 200. GeV 2.001 × 10^5 2.477 0.201 0.286 0.082 3.046 7.677 × 10^4 300. GeV 3.001 × 10^5 2.518 0.317 0.453 0.123 3.411 1.078 × 10^5 400. GeV 4.001 × 10^5 2.547 0.438 0.627 0.163 3.775 1.356 × 10^5 800. GeV 7.999 × 10^5 2.617 0.936 1.350 0.330 5.234 Muon critical energy 800. GeV 8.001 × 10^5 2.617 0.937 1.351 0.330 5.235 2.252 × 10^5 1.00 TeV 1.000 × 10^6 2.640 1.194 1.724 0.415 5.974 2.610 × 10^5 1.40 TeV 1.400 × 10^6 2.675 1.713 2.467 0.588 7.442 3.208 × 10^5 2.00 TeV 2.000 × 10^6 2.712 2.508 3.603 0.852 9.675 3.914 × 10^5 3.00 TeV 3.000 × 10^6 2.755 3.840 5.494 1.305 13.395 4.789 × 10^5 4.00 TeV 4.000 × 10^6 2.786 5.194 7.411 1.765 17.157 5.447 × 10^5 8.00 TeV 8.000 × 10^6 2.862 10.671 15.127 3.682 32.342 7.117 × 10^5 10.0 TeV 1.000 × 10^7 2.887 13.438 19.011 4.669 40.006 7.672 × 10^5 14.0 TeV 1.400 × 10^7 2.925 18.961 26.753 6.700 55.340 8.519 × 10^5 20.0 TeV 2.000 × 10^7 2.966 27.311 38.427 9.820 78.525 9.425 × 10^5 30.0 TeV 3.000 × 10^7 3.014 41.204 57.855 15.231 117.305 1.046 × 10^6 40.0 TeV 4.000 × 10^7 3.048 55.163 77.343 20.783 156.337 1.120 × 10^6 80.0 TeV 8.000 × 10^7 3.133 111.138 155.356 44.055 313.681 1.297 × 10^6 100. TeV 1.000 × 10^8 3.161 139.197 194.406 56.109 392.873 1.354 × 10^6