Table 142: Muons in Chlorobenzene C_6H_5Cl

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.51529 1.106 89.1 0.09856 3.3797 0.1714 2.9272 3.8201 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.229 7.229 7.658 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.644 5.644 1.399 × 10^0 20.0 MeV 6.802 × 10^1 4.411 4.411 2.615 × 10^0 30.0 MeV 8.509 × 10^1 3.425 3.425 5.224 × 10^0 40.0 MeV 1.003 × 10^2 2.926 2.926 8.403 × 10^0 80.0 MeV 1.527 × 10^2 2.200 2.200 2.467 × 10^1 100. MeV 1.764 × 10^2 2.065 2.065 3.408 × 10^1 140. MeV 2.218 × 10^2 1.926 1.926 5.423 × 10^1 200. MeV 2.868 × 10^2 1.848 1.848 8.615 × 10^1 300. MeV 3.917 × 10^2 1.821 0.000 1.821 1.408 × 10^2 303. MeV 3.950 × 10^2 1.821 0.000 1.821 Minimum ionization 400. MeV 4.945 × 10^2 1.830 0.000 1.830 1.956 × 10^2 800. MeV 8.995 × 10^2 1.906 0.000 0.000 1.906 4.098 × 10^2 1.00 GeV 1.101 × 10^3 1.940 0.000 0.000 1.940 5.138 × 10^2 1.40 GeV 1.502 × 10^3 1.994 0.000 0.000 0.001 1.995 7.169 × 10^2 2.00 GeV 2.103 × 10^3 2.054 0.001 0.000 0.001 2.056 1.013 × 10^3 3.00 GeV 3.104 × 10^3 2.122 0.001 0.001 0.001 2.126 1.491 × 10^3 4.00 GeV 4.104 × 10^3 2.169 0.002 0.001 0.002 2.174 1.956 × 10^3 8.00 GeV 8.105 × 10^3 2.276 0.004 0.004 0.004 2.289 3.743 × 10^3 10.0 GeV 1.011 × 10^4 2.309 0.006 0.006 0.005 2.325 4.610 × 10^3 14.0 GeV 1.411 × 10^4 2.356 0.009 0.009 0.006 2.380 6.309 × 10^3 20.0 GeV 2.011 × 10^4 2.403 0.014 0.016 0.009 2.441 8.796 × 10^3 30.0 GeV 3.011 × 10^4 2.453 0.022 0.027 0.013 2.516 1.283 × 10^4 40.0 GeV 4.011 × 10^4 2.487 0.031 0.040 0.017 2.576 1.675 × 10^4 80.0 GeV 8.011 × 10^4 2.565 0.071 0.096 0.034 2.767 3.171 × 10^4 100. GeV 1.001 × 10^5 2.590 0.093 0.127 0.042 2.851 3.883 × 10^4 140. GeV 1.401 × 10^5 2.626 0.136 0.190 0.058 3.011 5.248 × 10^4 200. GeV 2.001 × 10^5 2.663 0.205 0.291 0.082 3.242 7.168 × 10^4 300. GeV 3.001 × 10^5 2.706 0.323 0.462 0.124 3.615 1.009 × 10^5 400. GeV 4.001 × 10^5 2.737 0.445 0.639 0.165 3.986 1.272 × 10^5 800. GeV 8.001 × 10^5 2.810 0.953 1.374 0.333 5.471 2.125 × 10^5 843. GeV 8.432 × 10^5 2.816 1.010 1.455 0.351 5.632 Muon critical energy 1.00 TeV 1.000 × 10^6 2.834 1.216 1.753 0.418 6.221 2.468 × 10^5 1.40 TeV 1.400 × 10^6 2.871 1.744 2.508 0.593 7.716 3.044 × 10^5 2.00 TeV 2.000 × 10^6 2.910 2.554 3.665 0.858 9.987 3.726 × 10^5 3.00 TeV 3.000 × 10^6 2.955 3.910 5.588 1.315 13.769 4.575 × 10^5 4.00 TeV 4.000 × 10^6 2.988 5.289 7.538 1.779 17.594 5.216 × 10^5 8.00 TeV 8.000 × 10^6 3.068 10.867 15.385 3.712 33.033 6.849 × 10^5 10.0 TeV 1.000 × 10^7 3.094 13.686 19.336 4.708 40.825 7.393 × 10^5 14.0 TeV 1.400 × 10^7 3.134 19.313 27.210 6.758 56.416 8.223 × 10^5 20.0 TeV 2.000 × 10^7 3.177 27.821 39.083 9.907 79.988 9.112 × 10^5 30.0 TeV 3.000 × 10^7 3.227 41.976 58.841 15.372 119.417 1.013 × 10^6 40.0 TeV 4.000 × 10^7 3.263 56.201 78.661 20.979 159.103 1.085 × 10^6 80.0 TeV 8.000 × 10^7 3.352 113.219 158.002 44.496 319.069 1.259 × 10^6 100. TeV 1.000 × 10^8 3.381 141.796 197.716 56.683 399.576 1.315 × 10^6