Table 111: Muons in B-100 Bone-equivalent plastic

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.52740 1.450 85.9 0.05268 3.7365 0.1252 3.0420 3.4528 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.435 7.435 7.443 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.803 5.803 1.360 × 10^0 20.0 MeV 6.802 × 10^1 4.535 4.535 2.543 × 10^0 30.0 MeV 8.509 × 10^1 3.521 3.521 5.080 × 10^0 40.0 MeV 1.003 × 10^2 3.008 3.008 8.173 × 10^0 80.0 MeV 1.527 × 10^2 2.256 2.256 2.401 × 10^1 100. MeV 1.764 × 10^2 2.115 2.115 3.319 × 10^1 140. MeV 2.218 × 10^2 1.971 1.971 5.287 × 10^1 200. MeV 2.868 × 10^2 1.889 1.889 8.408 × 10^1 300. MeV 3.917 × 10^2 1.859 0.000 1.859 1.376 × 10^2 314. MeV 4.065 × 10^2 1.859 0.000 1.859 Minimum ionization 400. MeV 4.945 × 10^2 1.866 0.000 1.866 1.913 × 10^2 800. MeV 8.995 × 10^2 1.940 0.000 0.000 1.940 4.016 × 10^2 1.00 GeV 1.101 × 10^3 1.973 0.000 0.000 1.974 5.037 × 10^2 1.40 GeV 1.502 × 10^3 2.027 0.000 0.000 0.001 2.028 7.036 × 10^2 2.00 GeV 2.103 × 10^3 2.086 0.001 0.000 0.001 2.088 9.949 × 10^2 3.00 GeV 3.104 × 10^3 2.153 0.001 0.001 0.001 2.157 1.466 × 10^3 4.00 GeV 4.104 × 10^3 2.200 0.002 0.001 0.002 2.205 1.924 × 10^3 8.00 GeV 8.105 × 10^3 2.308 0.004 0.004 0.004 2.320 3.687 × 10^3 10.0 GeV 1.011 × 10^4 2.341 0.006 0.006 0.005 2.357 4.542 × 10^3 14.0 GeV 1.411 × 10^4 2.388 0.008 0.009 0.007 2.412 6.218 × 10^3 20.0 GeV 2.011 × 10^4 2.436 0.013 0.015 0.009 2.473 8.673 × 10^3 30.0 GeV 3.011 × 10^4 2.487 0.021 0.026 0.013 2.548 1.265 × 10^4 40.0 GeV 4.011 × 10^4 2.522 0.030 0.039 0.017 2.609 1.653 × 10^4 80.0 GeV 8.011 × 10^4 2.602 0.069 0.093 0.034 2.798 3.131 × 10^4 100. GeV 1.001 × 10^5 2.627 0.090 0.123 0.042 2.881 3.835 × 10^4 140. GeV 1.401 × 10^5 2.663 0.132 0.184 0.058 3.038 5.187 × 10^4 200. GeV 2.001 × 10^5 2.702 0.199 0.282 0.083 3.266 7.091 × 10^4 300. GeV 3.001 × 10^5 2.746 0.313 0.447 0.124 3.630 9.993 × 10^4 400. GeV 4.001 × 10^5 2.777 0.432 0.619 0.165 3.993 1.262 × 10^5 800. GeV 8.001 × 10^5 2.852 0.925 1.332 0.334 5.444 2.116 × 10^5 877. GeV 8.772 × 10^5 2.863 1.023 1.473 0.367 5.725 Muon critical energy 1.00 TeV 1.000 × 10^6 2.877 1.180 1.700 0.420 6.176 2.461 × 10^5 1.40 TeV 1.400 × 10^6 2.914 1.692 2.432 0.595 7.634 3.043 × 10^5 2.00 TeV 2.000 × 10^6 2.954 2.479 3.554 0.862 9.849 3.733 × 10^5 3.00 TeV 3.000 × 10^6 3.001 3.796 5.420 1.321 13.539 4.596 × 10^5 4.00 TeV 4.000 × 10^6 3.034 5.136 7.311 1.788 17.269 5.248 × 10^5 8.00 TeV 8.000 × 10^6 3.116 10.556 14.927 3.730 32.330 6.914 × 10^5 10.0 TeV 1.000 × 10^7 3.143 13.296 18.761 4.731 39.931 7.470 × 10^5 14.0 TeV 1.400 × 10^7 3.184 18.764 26.404 6.792 55.143 8.319 × 10^5 20.0 TeV 2.000 × 10^7 3.228 27.031 37.928 9.958 78.146 9.228 × 10^5 30.0 TeV 3.000 × 10^7 3.279 40.792 57.102 15.452 116.625 1.027 × 10^6 40.0 TeV 4.000 × 10^7 3.316 54.620 76.334 21.091 155.362 1.101 × 10^6 80.0 TeV 8.000 × 10^7 3.407 110.058 153.330 44.748 311.543 1.279 × 10^6 100. TeV 1.000 × 10^8 3.437 137.844 191.873 57.009 390.162 1.337 × 10^6