Table 311: b(E) × 10^6 [cm^2g^{−1}] for Bohrium, Z =107, A =[270.134(4)]

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 2.5511 0.0836 0.3548 2.9894 5. 3.5504 2.0831 0.3787 6.0122 10. 4.3675 3.6436 0.3715 8.3826 20. 5.2058 5.0518 0.3536 10.6113 50. 6.3000 7.2327 0.3438 13.8765 100. 7.0752 8.6630 0.3369 16.0751 200. 7.7791 9.9226 0.3337 18.0354 500. 8.5636 11.0688 0.3339 19.9663 1000. 9.0321 11.6720 0.3390 21.0431 2000. 9.3937 12.1047 0.3471 21.8455 5000. 9.7263 12.4651 0.3618 22.5532 10000. 9.8895 12.6306 0.3764 22.8965 20000. 9.9969 12.7387 0.3934 23.1290 50000. 10.0927 12.8181 0.4200 23.3308 100000. 10.1241 12.8514 0.4428 23.4183