Table 295: b(E) × 10^6 [cm^2g^{−1}] for water as calc from steam to check code ⟨Z/A⟩ = 0.55509

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2902 0.1278 0.4696 0.8876 5. 0.3937 0.3155 0.4973 1.2065 10. 0.4793 0.4763 0.4824 1.4380 20. 0.5695 0.6511 0.4601 1.6807 50. 0.6920 0.8973 0.4357 2.0251 100. 0.7830 1.0711 0.4239 2.2780 200. 0.8702 1.2312 0.4177 2.5191 500. 0.9727 1.3952 0.4168 2.7847 1000. 1.0384 1.4956 0.4235 2.9575 2000. 1.0930 1.5661 0.4348 3.0938 5000. 1.1476 1.6282 0.4559 3.2317 10000. 1.1766 1.6575 0.4773 3.3116 20000. 1.1972 1.6760 0.5026 3.3758 50000. 1.2149 1.6907 0.5420 3.4476 100000. 1.2235 1.6966 0.5759 3.4961