Table 246: b(E) × 10^6 [cm^2g^{−1}] for Silver bromide AgBr

⟨Z/A⟩ = 0.43670

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.1873 0.5075 0.3912 2.0861 5. 1.6318 1.3843 0.4180 3.4341 10. 1.9929 2.0655 0.3993 4.4577 20. 2.3636 2.7348 0.3908 5.4892 50. 2.8511 3.7278 0.3769 6.9558 100. 3.2001 4.3944 0.3687 7.9632 200. 3.5216 4.9941 0.3647 8.8805 500. 3.8874 5.5528 0.3647 9.8049 1000. 4.1110 5.8531 0.3705 10.3347 2000. 4.2875 6.0718 0.3797 10.7390 5000. 4.4540 6.2559 0.3964 11.1063 10000. 4.5377 6.3417 0.4132 11.2925 20000. 4.5938 6.3975 0.4327 11.4241 50000. 4.6406 6.4398 0.4631 11.5435 100000. 4.6618 6.4574 0.4890 11.6083