Table 240: b(E) × 10^6 [cm^2g^{−1}] for n-propyl alcohol (C_3H_7OH)

⟨Z/A⟩ = 0.56577

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2432 0.1047 0.4781 0.8261 5. 0.3302 0.2607 0.5055 1.0963 10. 0.4026 0.3978 0.4898 1.2902 20. 0.4795 0.5474 0.4666 1.4936 50. 0.5849 0.7576 0.4414 1.7840 100. 0.6643 0.9068 0.4290 2.0001 200. 0.7394 1.0447 0.4227 2.2067 500. 0.8291 1.1882 0.4216 2.4390 1000. 0.8870 1.2768 0.4283 2.5922 2000. 0.9354 1.3397 0.4399 2.7149 5000. 0.9842 1.3954 0.4615 2.8412 10000. 1.0105 1.4218 0.4834 2.9157 20000. 1.0291 1.4384 0.5093 2.9768 50000. 1.0454 1.4514 0.5497 3.0465 100000. 1.0528 1.4567 0.5845 3.0941