Table 238: b(E) × 10^6 [cm^2g^{−1}] for Propane (C_3H_8) ⟨Z/A⟩ = 0.58962

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2179 0.0921 0.4849 0.7949 5. 0.2961 0.2311 0.5122 1.0394 10. 0.3618 0.3563 0.4958 1.2138 20. 0.4318 0.4930 0.4720 1.3968 50. 0.5286 0.6848 0.4459 1.6594 100. 0.6023 0.8212 0.4332 1.8567 200. 0.6716 0.9477 0.4266 2.0459 500. 0.7551 1.0811 0.4254 2.2617 1000. 0.8095 1.1638 0.4321 2.4055 2000. 0.8551 1.2231 0.4439 2.5220 5000. 0.9015 1.2759 0.4658 2.6433 10000. 0.9267 1.3009 0.4881 2.7157 20000. 0.9448 1.3166 0.5144 2.7758 50000. 0.9607 1.3288 0.5556 2.8451 100000. 0.9679 1.3338 0.5912 2.8928