Table 234: b(E) × 10^6 [cm^2g^{−1}] for Polyvinylidene fluoride [CH_2CHF_2]_n ⟨Z/A⟩ = 0.49973

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2888 0.1285 0.4625 0.8800 5. 0.3917 0.3160 0.4897 1.1974 10. 0.4765 0.4748 0.4755 1.4269 20. 0.5656 0.6475 0.4541 1.6671 50. 0.6862 0.8908 0.4306 2.0076 100. 0.7760 1.0625 0.4191 2.2576 200. 0.8608 1.2204 0.4134 2.4947 500. 0.9609 1.3815 0.4126 2.7550 1000. 1.0248 1.4798 0.4194 2.9240 2000. 1.0777 1.5484 0.4306 3.0567 5000. 1.1302 1.6088 0.4515 3.1905 10000. 1.1580 1.6374 0.4725 3.2678 20000. 1.1773 1.6554 0.4972 3.3299 50000. 1.1939 1.6697 0.5359 3.3995 100000. 1.2015 1.6756 0.5691 3.4462