Table 207: b(E) × 10^6 [cm^2g^{−1}] for Nitrous oxide N_2O ⟨Z/A⟩ = 0.49985

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2906 0.1285 0.4627 0.8818 5. 0.3937 0.3158 0.4900 1.1995 10. 0.4786 0.4745 0.4757 1.4288 20. 0.5677 0.6474 0.4543 1.6695 50. 0.6884 0.8909 0.4310 2.0102 100. 0.7777 1.0630 0.4196 2.2603 200. 0.8630 1.2215 0.4138 2.4983 500. 0.9632 1.3833 0.4129 2.7595 1000. 1.0272 1.4821 0.4198 2.9291 2000. 1.0801 1.5511 0.4310 3.0621 5000. 1.1325 1.6118 0.4519 3.1962 10000. 1.1601 1.6406 0.4730 3.2737 20000. 1.1794 1.6587 0.4976 3.3358 50000. 1.1959 1.6731 0.5364 3.4053 100000. 1.2037 1.6790 0.5696 3.4523