Table 201: b(E) × 10^6 [cm^2g^{−1}] for Skeletal muscle (ICRP)

⟨Z/A⟩ = 0.54938

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2863 0.1260 0.4697 0.8820 5. 0.3885 0.3111 0.4972 1.1968 10. 0.4729 0.4697 0.4823 1.4250 20. 0.5619 0.6423 0.4601 1.6642 50. 0.6828 0.8852 0.4357 2.0038 100. 0.7727 1.0568 0.4239 2.2533 200. 0.8586 1.2148 0.4177 2.4911 500. 0.9598 1.3769 0.4168 2.7535 1000. 1.0247 1.4760 0.4235 2.9242 2000. 1.0785 1.5457 0.4348 3.0590 5000. 1.1324 1.6071 0.4560 3.1955 10000. 1.1610 1.6361 0.4774 3.2746 20000. 1.1813 1.6544 0.5026 3.3383 50000. 1.1987 1.6689 0.5421 3.4097 100000. 1.2070 1.6748 0.5760 3.4579