Table 199: b(E) × 10^6 [cm^2g^{−1}] for Mix D wax ⟨Z/A⟩ = 0.56479

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2413 0.1039 0.4788 0.8240 5. 0.3277 0.2590 0.5061 1.0927 10. 0.3997 0.3955 0.4903 1.2855 20. 0.4762 0.5442 0.4671 1.4874 50. 0.5810 0.7531 0.4418 1.7759 100. 0.6602 0.9013 0.4293 1.9909 200. 0.7347 1.0383 0.4230 2.1960 500. 0.8238 1.1810 0.4219 2.4268 1000. 0.8815 1.2688 0.4287 2.5790 2000. 0.9296 1.3314 0.4403 2.7012 5000. 0.9780 1.3869 0.4619 2.8269 10000. 1.0042 1.4131 0.4839 2.9011 20000. 1.0228 1.4296 0.5098 2.9621 50000. 1.0389 1.4425 0.5503 3.0316 100000. 1.0461 1.4478 0.5852 3.0791