Table 193: b(E) × 10^6 [cm^2g^{−1}] for Magnesium fluoride MgF_2

⟨Z/A⟩ = 0.48153

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3729 0.1703 0.4493 0.9925 5. 0.5058 0.4161 0.4767 1.3985 10. 0.6144 0.6183 0.4638 1.6966 20. 0.7276 0.8364 0.4437 2.0078 50. 0.8796 1.1449 0.4216 2.4462 100. 0.9912 1.3612 0.4108 2.7632 200. 1.0971 1.5588 0.4055 3.0614 500. 1.2206 1.7564 0.4048 3.3817 1000. 1.2985 1.8757 0.4115 3.5858 2000. 1.3626 1.9578 0.4224 3.7428 5000. 1.4255 2.0297 0.4425 3.8977 10000. 1.4583 2.0636 0.4628 3.9847 20000. 1.4813 2.0851 0.4865 4.0529 50000. 1.5003 2.1023 0.5236 4.1262 100000. 1.5094 2.1093 0.5554 4.1741