Table 185: b(E) × 10^6 [cm^2g^{−1}] for Lithium fluoride (LiF)

⟨Z/A⟩ = 0.46262

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2703 0.1209 0.4631 0.8543 5. 0.3668 0.2972 0.4895 1.1536 10. 0.4464 0.4463 0.4751 1.3679 20. 0.5299 0.6083 0.4537 1.5919 50. 0.6431 0.8364 0.4303 1.9098 100. 0.7269 0.9981 0.4189 2.1441 200. 0.8067 1.1455 0.4133 2.3655 500. 0.9004 1.2963 0.4125 2.6092 1000. 0.9600 1.3884 0.4195 2.7679 2000. 1.0094 1.4527 0.4308 2.8929 5000. 1.0583 1.5096 0.4517 3.0196 10000. 1.0841 1.5365 0.4728 3.0934 20000. 1.1021 1.5535 0.4975 3.1531 50000. 1.1174 1.5669 0.5363 3.2206 100000. 1.1246 1.5725 0.5695 3.2666