Table 156: b(E) × 10^6 [cm^2g^{−1}] for Eye lens (ICRP) ⟨Z/A⟩ = 0.54977

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2772 0.1215 0.4709 0.8695 5. 0.3760 0.3003 0.4983 1.1747 10. 0.4578 0.4541 0.4833 1.3954 20. 0.5441 0.6216 0.4610 1.6268 50. 0.6616 0.8573 0.4365 1.9555 100. 0.7491 1.0240 0.4246 2.1977 200. 0.8326 1.1776 0.4185 2.4287 500. 0.9311 1.3356 0.4175 2.6843 1000. 0.9944 1.4324 0.4242 2.8510 2000. 1.0470 1.5005 0.4356 2.9831 5000. 1.0996 1.5607 0.4568 3.1170 10000. 1.1276 1.5890 0.4783 3.1950 20000. 1.1474 1.6070 0.5036 3.2580 50000. 1.1645 1.6211 0.5432 3.3288 100000. 1.1726 1.6269 0.5773 3.3768