Table 146: b(E) × 10^6 [cm^2g^{−1}] for 1,2-Dichlorobenzene (C_6H_4Cl_2)

⟨Z/A⟩ = 0.50339

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.4047 0.1858 0.4525 1.0430 5. 0.5500 0.4566 0.4799 1.4865 10. 0.6688 0.6786 0.4666 1.8141 20. 0.7927 0.9155 0.4461 2.1542 50. 0.9586 1.2516 0.4235 2.6337 100. 1.0807 1.4860 0.4125 2.9793 200. 1.1949 1.7025 0.4070 3.3044 500. 1.3288 1.9161 0.4063 3.6512 1000. 1.4134 2.0386 0.4129 3.8650 2000. 1.4825 2.1279 0.4239 4.0342 5000. 1.5501 2.2050 0.4441 4.1992 10000. 1.5855 2.2413 0.4645 4.2912 20000. 1.6104 2.2642 0.4885 4.3631 50000. 1.6307 2.2826 0.5260 4.4392 100000. 1.6401 2.2901 0.5581 4.4883