Table 142: b(E) × 10^6 [cm^2g^{−1}] for Chlorobenzene C_6H_5Cl

⟨Z/A⟩ = 0.51529

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3447 0.1558 0.4608 0.9614 5. 0.4683 0.3840 0.4881 1.3404 10. 0.5698 0.5742 0.4740 1.6181 20. 0.6760 0.7783 0.4527 1.9070 50. 0.8191 1.0671 0.4293 2.3156 100. 0.9252 1.2695 0.4178 2.6126 200. 1.0244 1.4566 0.4121 2.8930 500. 1.1414 1.6437 0.4113 3.1964 1000. 1.2158 1.7531 0.4180 3.3869 2000. 1.2768 1.8323 0.4292 3.5381 5000. 1.3369 1.9012 0.4499 3.6880 10000. 1.3686 1.9336 0.4708 3.7730 20000. 1.3910 1.9541 0.4954 3.8405 50000. 1.4095 1.9705 0.5338 3.9138 100000. 1.4180 1.9772 0.5668 3.9619