Table 130: b(E) × 10^6 [cm^2g^{−1}] for Calcium fluoride (CaF_2)

⟨Z/A⟩ = 0.49670

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.5234 0.2436 0.4381 1.2051 5. 0.7116 0.5985 0.4659 1.7760 10. 0.8649 0.8837 0.4539 2.2026 20. 1.0236 1.1853 0.4348 2.6436 50. 1.2347 1.6146 0.4136 3.2630 100. 1.3884 1.9121 0.4033 3.7039 200. 1.5327 2.1854 0.3983 4.1164 500. 1.7001 2.4508 0.3977 4.5486 1000. 1.8049 2.6015 0.4042 4.8107 2000. 1.8900 2.7101 0.4147 5.0148 5000. 1.9724 2.8034 0.4342 5.2100 10000. 2.0150 2.8474 0.4538 5.3162 20000. 2.0449 2.8756 0.4767 5.3972 50000. 2.0689 2.8976 0.5125 5.4789 100000. 2.0803 2.9067 0.5432 5.5303