Table 118: b(E) × 10^6 [cm^2g^{−1}] for Blood (ICRP) ⟨Z/A⟩ = 0.54995

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2864 0.1260 0.4697 0.8822 5. 0.3886 0.3112 0.4973 1.1971 10. 0.4731 0.4700 0.4824 1.4255 20. 0.5621 0.6426 0.4601 1.6648 50. 0.6831 0.8856 0.4357 2.0045 100. 0.7731 1.0573 0.4239 2.2542 200. 0.8590 1.2154 0.4178 2.4922 500. 0.9603 1.3776 0.4168 2.7547 1000. 1.0252 1.4767 0.4235 2.9255 2000. 1.0791 1.5465 0.4348 3.0604 5000. 1.1330 1.6079 0.4560 3.1969 10000. 1.1616 1.6369 0.4774 3.2761 20000. 1.1819 1.6553 0.5027 3.3398 50000. 1.1994 1.6697 0.5421 3.4112 100000. 1.2077 1.6756 0.5760 3.4594