Table 114: b(E) × 10^6 [cm^2g^{−1}] for Barium sulfate BaSO_4

⟨Z/A⟩ = 0.44561

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.0065 0.3875 0.4076 1.8015 5. 1.3853 1.1348 0.4341 2.9543 10. 1.6940 1.7190 0.4241 3.8370 20. 2.0114 2.2901 0.4042 4.7058 50. 2.4294 3.1380 0.3886 5.9561 100. 2.7290 3.7075 0.3797 6.8162 200. 3.0053 4.2166 0.3753 7.5972 500. 3.3193 4.6977 0.3751 8.3921 1000. 3.5113 4.9574 0.3810 8.8498 2000. 3.6630 5.1453 0.3907 9.1990 5000. 3.8061 5.3039 0.4084 9.5184 10000. 3.8782 5.3777 0.4261 9.6821 20000. 3.9268 5.4256 0.4469 9.7993 50000. 3.9670 5.4619 0.4792 9.9082 100000. 3.9853 5.4771 0.5069 9.9693