Table 043: b(E) × 10^6 [cm^2g^{−1}] for Technetium, Z = 43, A =[97.90722(3)]

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.2093 0.5181 0.3896 2.1169 5. 1.6623 1.4129 0.4163 3.4915 10. 2.0305 2.1077 0.3978 4.5360 20. 2.4084 2.7895 0.3869 5.5848 50. 2.9052 3.8016 0.3756 7.0824 100. 3.2609 4.4806 0.3674 8.1089 200. 3.5885 5.0912 0.3635 9.0431 500. 3.9609 5.6597 0.3635 9.9841 1000. 4.1885 5.9650 0.3692 10.5228 2000. 4.3681 6.1874 0.3783 10.9338 5000. 4.5373 6.3745 0.3950 11.3068 10000. 4.6224 6.4616 0.4117 11.4957 20000. 4.6794 6.5184 0.4311 11.6289 50000. 4.7269 6.5614 0.4613 11.7496 100000. 4.7484 6.5792 0.4871 11.8147