Table 020: b(E) × 10^6 [cm^2g^{−1}] for Calcium, Z = 20, A =40.078(4)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.7088 0.3338 0.4240 1.4666 5. 0.9648 0.8218 0.4523 2.2389 10. 1.1726 1.2083 0.4416 2.8225 20. 1.3869 1.6123 0.4237 3.4228 50. 1.6705 2.1898 0.4038 4.2642 100. 1.8759 2.5874 0.3941 4.8574 200. 2.0675 2.9529 0.3893 5.4097 500. 2.2889 3.3019 0.3889 5.9797 1000. 2.4269 3.4934 0.3951 6.3154 2000. 2.5378 3.6346 0.4052 6.5776 5000. 2.6445 3.7544 0.4239 6.8228 10000. 2.6993 3.8108 0.4426 6.9527 20000. 2.7380 3.8473 0.4645 7.0497 50000. 2.7680 3.8754 0.4986 7.1420 100000. 2.7825 3.8871 0.5278 7.1975