Table 010: b(E) × 10^6 [cm^2g^{−1}] for Neon gas, Z = 10, A =20.1797(6)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3782 0.1720 0.4506 1.0008 5. 0.5127 0.4202 0.4783 1.4112 10. 0.6226 0.6248 0.4653 1.7127 20. 0.7373 0.8456 0.4450 2.0279 50. 0.8912 1.1580 0.4228 2.4719 100. 1.0041 1.3770 0.4119 2.7931 200. 1.1115 1.5773 0.4065 3.0953 500. 1.2367 1.7778 0.4058 3.4202 1000. 1.3158 1.8990 0.4125 3.6273 2000. 1.3808 1.9825 0.4233 3.7866 5000. 1.4446 2.0555 0.4435 3.9437 10000. 1.4780 2.0900 0.4639 4.0319 20000. 1.5011 2.1118 0.4877 4.1007 50000. 1.5208 2.1293 0.5250 4.1750 100000. 1.5300 2.1364 0.5569 4.2234