Table 008: b(E) × 10^6 [cm^2g^{−1}] for Oxygen gas (O_2), Z = 8, A =15.9994(3)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3130 0.1395 0.4595 0.9120 5. 0.4241 0.3421 0.4869 1.2531 10. 0.5153 0.5123 0.4730 1.5007 20. 0.6109 0.6975 0.4519 1.7603 50. 0.7400 0.9584 0.4288 2.1273 100. 0.8353 1.1426 0.4176 2.3955 200. 0.9263 1.3118 0.4119 2.6500 500. 1.0329 1.4835 0.4111 2.9275 1000. 1.1007 1.5881 0.4179 3.1067 2000. 1.1567 1.6609 0.4290 3.2466 5000. 1.2121 1.7248 0.4497 3.3866 10000. 1.2412 1.7550 0.4706 3.4669 20000. 1.2615 1.7741 0.4951 3.5307 50000. 1.2788 1.7893 0.5334 3.6015 100000. 1.2870 1.7955 0.5662 3.6488