Table 293: Muons in Solid carbon dioxide (dry ice; CO_2)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.49989 1.563 85.0 0.43387 3.0000 0.2000 2.0000 3.4513 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.057 7.057 7.841 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.508 5.508 1.432 × 10^0 20.0 MeV 6.802 × 10^1 4.304 4.304 2.679 × 10^0 30.0 MeV 8.509 × 10^1 3.341 3.341 5.353 × 10^0 40.0 MeV 1.003 × 10^2 2.854 2.854 8.612 × 10^0 80.0 MeV 1.527 × 10^2 2.145 2.145 2.529 × 10^1 100. MeV 1.764 × 10^2 2.017 2.017 3.493 × 10^1 140. MeV 2.218 × 10^2 1.886 1.886 5.554 × 10^1 200. MeV 2.868 × 10^2 1.812 1.812 8.811 × 10^1 300. MeV 3.917 × 10^2 1.787 0.000 1.787 1.438 × 10^2 303. MeV 3.950 × 10^2 1.787 0.000 1.787 Minimum ionization 400. MeV 4.945 × 10^2 1.795 0.000 1.795 1.997 × 10^2 800. MeV 8.995 × 10^2 1.866 0.000 0.000 1.866 4.182 × 10^2 1.00 GeV 1.101 × 10^3 1.896 0.000 0.000 1.897 5.245 × 10^2 1.40 GeV 1.502 × 10^3 1.946 0.000 0.001 1.947 7.325 × 10^2 2.00 GeV 2.103 × 10^3 1.999 0.001 0.000 0.001 2.001 1.036 × 10^3 3.00 GeV 3.104 × 10^3 2.060 0.001 0.001 0.001 2.063 1.528 × 10^3 4.00 GeV 4.104 × 10^3 2.101 0.002 0.001 0.002 2.106 2.007 × 10^3 8.00 GeV 8.105 × 10^3 2.196 0.004 0.003 0.004 2.207 3.857 × 10^3 10.0 GeV 1.011 × 10^4 2.225 0.005 0.005 0.005 2.240 4.757 × 10^3 14.0 GeV 1.411 × 10^4 2.268 0.007 0.008 0.007 2.290 6.522 × 10^3 20.0 GeV 2.011 × 10^4 2.312 0.011 0.013 0.009 2.345 9.110 × 10^3 30.0 GeV 3.011 × 10^4 2.359 0.019 0.023 0.013 2.415 1.331 × 10^4 40.0 GeV 4.011 × 10^4 2.392 0.027 0.034 0.017 2.470 1.740 × 10^4 80.0 GeV 8.011 × 10^4 2.468 0.061 0.081 0.034 2.644 3.303 × 10^4 100. GeV 1.001 × 10^5 2.491 0.079 0.107 0.042 2.719 4.049 × 10^4 140. GeV 1.401 × 10^5 2.526 0.116 0.161 0.058 2.862 5.482 × 10^4 200. GeV 2.001 × 10^5 2.563 0.174 0.247 0.083 3.067 7.507 × 10^4 300. GeV 3.001 × 10^5 2.604 0.275 0.392 0.124 3.395 1.060 × 10^5 400. GeV 4.001 × 10^5 2.634 0.379 0.543 0.165 3.722 1.342 × 10^5 800. GeV 8.001 × 10^5 2.705 0.813 1.172 0.334 5.025 2.263 × 10^5 927. GeV 9.270 × 10^5 2.720 0.955 1.377 0.388 5.441 Muon critical energy 1.00 TeV 1.000 × 10^6 2.728 1.037 1.497 0.420 5.683 2.637 × 10^5 1.40 TeV 1.400 × 10^6 2.764 1.489 2.143 0.595 6.991 3.271 × 10^5 2.00 TeV 2.000 × 10^6 2.802 2.181 3.133 0.862 8.978 4.026 × 10^5 3.00 TeV 3.000 × 10^6 2.846 3.342 4.781 1.320 12.289 4.975 × 10^5 4.00 TeV 4.000 × 10^6 2.877 4.523 6.451 1.786 15.638 5.695 × 10^5 8.00 TeV 8.000 × 10^6 2.955 9.300 13.178 3.728 29.160 7.539 × 10^5 10.0 TeV 1.000 × 10^7 2.980 11.714 16.565 4.728 35.988 8.155 × 10^5 14.0 TeV 1.400 × 10^7 3.019 16.532 23.316 6.787 49.654 9.097 × 10^5 20.0 TeV 2.000 × 10^7 3.061 23.817 33.496 9.949 70.324 1.011 × 10^6 30.0 TeV 3.000 × 10^7 3.110 35.946 50.437 15.437 104.930 1.126 × 10^6 40.0 TeV 4.000 × 10^7 3.144 48.136 67.432 21.069 139.781 1.209 × 10^6 80.0 TeV 8.000 × 10^7 3.231 97.010 135.468 44.687 280.396 1.407 × 10^6 100. TeV 1.000 × 10^8 3.259 121.509 169.526 56.926 351.220 1.471 × 10^6