Table 281: Muons in Standard rock

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.50000 2.650 136.4 0.08301 3.4120 0.0492 3.0549 3.7738 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.619 6.619 8.400 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.180 5.180 1.530 × 10^0 20.0 MeV 6.802 × 10^1 4.057 4.057 2.854 × 10^0 30.0 MeV 8.509 × 10^1 3.157 3.157 5.687 × 10^0 40.0 MeV 1.003 × 10^2 2.701 2.702 9.133 × 10^0 80.0 MeV 1.527 × 10^2 2.028 2.029 2.675 × 10^1 100. MeV 1.764 × 10^2 1.904 1.904 3.695 × 10^1 140. MeV 2.218 × 10^2 1.779 1.779 5.878 × 10^1 200. MeV 2.868 × 10^2 1.710 1.710 9.331 × 10^1 297. MeV 3.884 × 10^2 1.688 0.000 1.688 Minimum ionization 300. MeV 3.917 × 10^2 1.688 0.000 1.688 1.523 × 10^2 400. MeV 4.945 × 10^2 1.698 0.000 1.698 2.114 × 10^2 800. MeV 8.995 × 10^2 1.774 0.000 0.000 1.775 4.418 × 10^2 1.00 GeV 1.101 × 10^3 1.808 0.000 0.000 1.808 5.534 × 10^2 1.40 GeV 1.502 × 10^3 1.861 0.001 0.000 0.001 1.862 7.712 × 10^2 2.00 GeV 2.103 × 10^3 1.920 0.001 0.000 0.001 1.922 1.088 × 10^3 3.00 GeV 3.104 × 10^3 1.986 0.001 0.001 0.001 1.990 1.599 × 10^3 4.00 GeV 4.104 × 10^3 2.033 0.002 0.002 0.002 2.038 2.095 × 10^3 8.00 GeV 8.105 × 10^3 2.138 0.005 0.005 0.004 2.152 3.998 × 10^3 10.0 GeV 1.011 × 10^4 2.170 0.007 0.007 0.005 2.188 4.920 × 10^3 14.0 GeV 1.411 × 10^4 2.215 0.010 0.011 0.006 2.244 6.724 × 10^3 20.0 GeV 2.011 × 10^4 2.262 0.016 0.019 0.009 2.306 9.360 × 10^3 30.0 GeV 3.011 × 10^4 2.311 0.027 0.033 0.013 2.383 1.362 × 10^4 40.0 GeV 4.011 × 10^4 2.344 0.038 0.048 0.017 2.447 1.776 × 10^4 80.0 GeV 8.011 × 10^4 2.420 0.085 0.115 0.033 2.654 3.343 × 10^4 100. GeV 1.001 × 10^5 2.444 0.110 0.152 0.041 2.747 4.084 × 10^4 140. GeV 1.401 × 10^5 2.479 0.162 0.227 0.057 2.925 5.495 × 10^4 200. GeV 2.001 × 10^5 2.515 0.244 0.347 0.081 3.187 7.459 × 10^4 300. GeV 3.001 × 10^5 2.557 0.384 0.549 0.121 3.611 1.040 × 10^5 400. GeV 4.001 × 10^5 2.586 0.529 0.759 0.162 4.037 1.302 × 10^5 693. GeV 6.928 × 10^5 2.643 0.967 1.394 0.282 5.286 Muon critical energy 800. GeV 8.001 × 10^5 2.658 1.131 1.632 0.327 5.748 2.129 × 10^5 1.00 TeV 1.000 × 10^6 2.681 1.441 2.082 0.410 6.615 2.453 × 10^5 1.40 TeV 1.400 × 10^6 2.717 2.065 2.976 0.582 8.340 2.990 × 10^5 2.00 TeV 2.000 × 10^6 2.755 3.023 4.344 0.842 10.964 3.616 × 10^5 3.00 TeV 3.000 × 10^6 2.798 4.625 6.621 1.290 15.335 4.384 × 10^5 4.00 TeV 4.000 × 10^6 2.830 6.253 8.926 1.745 19.755 4.957 × 10^5 8.00 TeV 8.000 × 10^6 2.908 12.836 18.207 3.639 37.590 6.400 × 10^5 10.0 TeV 1.000 × 10^7 2.933 16.161 22.878 4.613 46.586 6.877 × 10^5 14.0 TeV 1.400 × 10^7 2.972 22.799 32.188 6.619 64.579 7.603 × 10^5 20.0 TeV 2.000 × 10^7 3.014 32.834 46.224 9.698 91.770 8.379 × 10^5 30.0 TeV 3.000 × 10^7 3.062 49.519 69.586 15.037 137.204 9.264 × 10^5 40.0 TeV 4.000 × 10^7 3.097 66.279 93.017 20.513 182.906 9.894 × 10^5 80.0 TeV 8.000 × 10^7 3.184 133.489 186.823 43.458 366.954 1.141 × 10^6 100. TeV 1.000 × 10^8 3.212 167.180 233.780 55.340 459.512 1.189 × 10^6