Table 269: Muons in Tungsten hexafluoride (WF_6)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.42976 2.400 354.4 0.03658 3.5134 0.3020 4.2602 5.9881 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.928 4.928 1.143 × 10^0 14.0 MeV 5.616 × 10^1 3.880 3.880 2.067 × 10^0 20.0 MeV 6.802 × 10^1 3.057 3.057 3.828 × 10^0 30.0 MeV 8.509 × 10^1 2.393 2.393 7.574 × 10^0 40.0 MeV 1.003 × 10^2 2.056 2.056 1.211 × 10^1 80.0 MeV 1.527 × 10^2 1.565 1.565 3.509 × 10^1 100. MeV 1.764 × 10^2 1.479 1.479 4.827 × 10^1 140. MeV 2.218 × 10^2 1.396 1.396 7.623 × 10^1 200. MeV 2.868 × 10^2 1.353 1.353 1.200 × 10^2 253. MeV 3.431 × 10^2 1.346 0.000 1.346 Minimum ionization 300. MeV 3.917 × 10^2 1.349 0.000 0.000 1.349 1.942 × 10^2 400. MeV 4.945 × 10^2 1.367 0.000 0.000 1.367 2.679 × 10^2 800. MeV 8.995 × 10^2 1.451 0.001 0.000 1.452 5.516 × 10^2 1.00 GeV 1.101 × 10^3 1.485 0.001 0.000 1.486 6.877 × 10^2 1.40 GeV 1.502 × 10^3 1.539 0.002 0.001 1.541 9.517 × 10^2 2.00 GeV 2.103 × 10^3 1.598 0.003 0.001 0.001 1.602 1.333 × 10^3 3.00 GeV 3.104 × 10^3 1.665 0.004 0.002 0.001 1.673 1.943 × 10^3 4.00 GeV 4.104 × 10^3 1.711 0.006 0.004 0.002 1.724 2.531 × 10^3 8.00 GeV 8.105 × 10^3 1.816 0.016 0.014 0.003 1.851 4.762 × 10^3 10.0 GeV 1.011 × 10^4 1.848 0.021 0.020 0.004 1.894 5.830 × 10^3 14.0 GeV 1.411 × 10^4 1.894 0.032 0.033 0.006 1.966 7.901 × 10^3 20.0 GeV 2.011 × 10^4 1.940 0.050 0.055 0.008 2.053 1.089 × 10^4 30.0 GeV 3.011 × 10^4 1.988 0.082 0.096 0.012 2.179 1.561 × 10^4 40.0 GeV 4.011 × 10^4 2.021 0.116 0.141 0.015 2.294 2.008 × 10^4 80.0 GeV 8.011 × 10^4 2.093 0.262 0.341 0.030 2.727 3.604 × 10^4 100. GeV 1.001 × 10^5 2.115 0.340 0.449 0.037 2.942 4.310 × 10^4 140. GeV 1.401 × 10^5 2.147 0.499 0.671 0.052 3.369 5.580 × 10^4 200. GeV 2.001 × 10^5 2.180 0.748 1.023 0.074 4.025 7.208 × 10^4 234. GeV 2.339 × 10^5 2.194 0.890 1.218 0.086 4.389 Muon critical energy 300. GeV 3.001 × 10^5 2.217 1.173 1.611 0.111 5.112 9.408 × 10^4 400. GeV 4.001 × 10^5 2.243 1.613 2.221 0.147 6.224 1.118 × 10^5 800. GeV 8.001 × 10^5 2.305 3.427 4.724 0.298 10.755 1.601 × 10^5 1.00 TeV 1.000 × 10^6 2.325 4.360 6.005 0.375 13.065 1.770 × 10^5 1.40 TeV 1.400 × 10^6 2.355 6.228 8.560 0.531 17.675 2.032 × 10^5 2.00 TeV 2.000 × 10^6 2.388 9.086 12.459 0.768 24.702 2.318 × 10^5 3.00 TeV 3.000 × 10^6 2.425 13.858 18.940 1.175 36.399 2.649 × 10^5 4.00 TeV 4.000 × 10^6 2.453 18.692 25.490 1.588 48.224 2.887 × 10^5 8.00 TeV 8.000 × 10^6 2.519 38.184 51.823 3.304 95.831 3.464 × 10^5 10.0 TeV 1.000 × 10^7 2.541 48.006 65.060 4.186 119.794 3.651 × 10^5 14.0 TeV 1.400 × 10^7 2.575 67.596 91.471 5.997 167.640 3.932 × 10^5 20.0 TeV 2.000 × 10^7 2.611 97.154 131.258 8.775 239.799 4.229 × 10^5 30.0 TeV 3.000 × 10^7 2.652 146.362 197.456 13.581 360.052 4.567 × 10^5 40.0 TeV 4.000 × 10^7 2.682 195.745 263.814 18.504 480.747 4.807 × 10^5 80.0 TeV 8.000 × 10^7 2.756 393.572 529.421 39.088 964.838 5.383 × 10^5 100. TeV 1.000 × 10^8 2.781 492.651 662.343 49.730 1207.507 5.568 × 10^5