Table 261: Muons in Soft tissue (ICRP)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55121 1.000 72.3 0.08926 3.5110 0.2211 2.7799 3.4354 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.947 7.947 6.952 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.198 6.198 1.271 × 10^0 20.0 MeV 6.802 × 10^1 4.839 4.839 2.379 × 10^0 30.0 MeV 8.509 × 10^1 3.754 3.754 4.759 × 10^0 40.0 MeV 1.003 × 10^2 3.205 3.205 7.661 × 10^0 80.0 MeV 1.527 × 10^2 2.406 2.406 2.253 × 10^1 100. MeV 1.764 × 10^2 2.262 2.262 3.112 × 10^1 140. MeV 2.218 × 10^2 2.106 2.107 4.953 × 10^1 200. MeV 2.868 × 10^2 2.017 2.017 7.876 × 10^1 300. MeV 3.917 × 10^2 1.982 0.000 1.983 1.289 × 10^2 318. MeV 4.105 × 10^2 1.982 0.000 1.982 Minimum ionization 400. MeV 4.945 × 10^2 1.988 0.000 1.989 1.793 × 10^2 800. MeV 8.995 × 10^2 2.063 0.000 0.000 2.063 3.769 × 10^2 1.00 GeV 1.101 × 10^3 2.097 0.000 0.000 2.098 4.730 × 10^2 1.40 GeV 1.502 × 10^3 2.152 0.000 0.001 2.153 6.611 × 10^2 2.00 GeV 2.103 × 10^3 2.213 0.001 0.000 0.001 2.215 9.355 × 10^2 3.00 GeV 3.104 × 10^3 2.283 0.001 0.001 0.001 2.286 1.379 × 10^3 4.00 GeV 4.104 × 10^3 2.332 0.001 0.001 0.002 2.336 1.812 × 10^3 8.00 GeV 8.105 × 10^3 2.442 0.003 0.003 0.004 2.453 3.478 × 10^3 10.0 GeV 1.011 × 10^4 2.476 0.005 0.005 0.005 2.490 4.287 × 10^3 14.0 GeV 1.411 × 10^4 2.525 0.007 0.008 0.007 2.546 5.874 × 10^3 20.0 GeV 2.011 × 10^4 2.574 0.011 0.012 0.009 2.607 8.202 × 10^3 30.0 GeV 3.011 × 10^4 2.627 0.018 0.022 0.014 2.681 1.198 × 10^4 40.0 GeV 4.011 × 10^4 2.664 0.025 0.032 0.018 2.739 1.567 × 10^4 80.0 GeV 8.011 × 10^4 2.747 0.058 0.078 0.034 2.917 2.980 × 10^4 100. GeV 1.001 × 10^5 2.773 0.075 0.102 0.042 2.993 3.657 × 10^4 140. GeV 1.401 × 10^5 2.811 0.110 0.154 0.059 3.135 4.962 × 10^4 200. GeV 2.001 × 10^5 2.852 0.166 0.235 0.084 3.337 6.817 × 10^4 300. GeV 3.001 × 10^5 2.898 0.262 0.374 0.125 3.659 9.677 × 10^4 400. GeV 4.001 × 10^5 2.930 0.362 0.518 0.167 3.978 1.230 × 10^5 800. GeV 8.001 × 10^5 3.009 0.778 1.119 0.338 5.244 2.103 × 10^5 1.00 TeV 1.000 × 10^6 3.035 0.993 1.430 0.424 5.883 2.463 × 10^5 1.06 TeV 1.064 × 10^6 3.042 1.061 1.528 0.453 6.084 Muon critical energy 1.40 TeV 1.400 × 10^6 3.074 1.426 2.049 0.602 7.150 3.078 × 10^5 2.00 TeV 2.000 × 10^6 3.116 2.091 2.997 0.872 9.075 3.822 × 10^5 3.00 TeV 3.000 × 10^6 3.164 3.206 4.575 1.336 12.281 4.766 × 10^5 4.00 TeV 4.000 × 10^6 3.199 4.341 6.175 1.808 15.523 5.488 × 10^5 8.00 TeV 8.000 × 10^6 3.284 8.937 12.621 3.774 28.616 7.358 × 10^5 10.0 TeV 1.000 × 10^7 3.312 11.262 15.867 4.786 35.228 7.987 × 10^5 14.0 TeV 1.400 × 10^7 3.355 15.901 22.336 6.873 48.466 8.951 × 10^5 20.0 TeV 2.000 × 10^7 3.401 22.920 32.093 10.080 68.495 9.987 × 10^5 30.0 TeV 3.000 × 10^7 3.455 34.608 48.327 15.646 102.037 1.118 × 10^6 40.0 TeV 4.000 × 10^7 3.493 46.360 64.613 21.360 135.826 1.202 × 10^6 80.0 TeV 8.000 × 10^7 3.588 93.491 129.814 45.342 272.236 1.406 × 10^6 100. TeV 1.000 × 10^8 3.620 117.123 162.453 57.775 340.971 1.472 × 10^6