Table 259: Muons in Tetrachloroethylene C_2C_{l4}

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.48241 1.625 159.2 0.18595 3.0156 0.1713 2.9083 4.6619 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.248 6.248 8.915 × 10^{−1} 14.0 MeV 5.616 × 10^1 4.893 4.893 1.622 × 10^0 20.0 MeV 6.802 × 10^1 3.836 3.836 3.023 × 10^0 30.0 MeV 8.509 × 10^1 2.988 2.988 6.017 × 10^0 40.0 MeV 1.003 × 10^2 2.558 2.558 9.657 × 10^0 80.0 MeV 1.527 × 10^2 1.932 1.932 2.821 × 10^1 100. MeV 1.764 × 10^2 1.819 1.819 3.891 × 10^1 140. MeV 2.218 × 10^2 1.705 1.706 6.172 × 10^1 200. MeV 2.868 × 10^2 1.645 1.645 9.767 × 10^1 277. MeV 3.683 × 10^2 1.629 0.000 1.630 Minimum ionization 300. MeV 3.917 × 10^2 1.630 0.000 1.630 1.589 × 10^2 400. MeV 4.945 × 10^2 1.644 0.000 1.645 2.200 × 10^2 800. MeV 8.995 × 10^2 1.728 0.000 0.000 1.728 4.571 × 10^2 1.00 GeV 1.101 × 10^3 1.763 0.000 0.000 1.764 5.717 × 10^2 1.40 GeV 1.502 × 10^3 1.819 0.001 0.000 0.001 1.820 7.947 × 10^2 2.00 GeV 2.103 × 10^3 1.879 0.001 0.001 0.001 1.882 1.119 × 10^3 3.00 GeV 3.104 × 10^3 1.948 0.002 0.001 0.001 1.952 1.640 × 10^3 4.00 GeV 4.104 × 10^3 1.995 0.003 0.002 0.002 2.002 2.145 × 10^3 8.00 GeV 8.105 × 10^3 2.101 0.007 0.007 0.004 2.118 4.081 × 10^3 10.0 GeV 1.011 × 10^4 2.133 0.009 0.009 0.005 2.156 5.016 × 10^3 14.0 GeV 1.411 × 10^4 2.179 0.014 0.015 0.006 2.213 6.846 × 10^3 20.0 GeV 2.011 × 10^4 2.224 0.021 0.024 0.009 2.278 9.516 × 10^3 30.0 GeV 3.011 × 10^4 2.272 0.034 0.042 0.013 2.362 1.382 × 10^4 40.0 GeV 4.011 × 10^4 2.305 0.049 0.062 0.017 2.432 1.799 × 10^4 80.0 GeV 8.011 × 10^4 2.378 0.110 0.149 0.032 2.670 3.366 × 10^4 100. GeV 1.001 × 10^5 2.401 0.142 0.196 0.040 2.780 4.100 × 10^4 140. GeV 1.401 × 10^5 2.434 0.209 0.294 0.056 2.994 5.486 × 10^4 200. GeV 2.001 × 10^5 2.470 0.314 0.449 0.079 3.313 7.391 × 10^4 300. GeV 3.001 × 10^5 2.510 0.494 0.710 0.119 3.833 1.019 × 10^5 400. GeV 4.001 × 10^5 2.538 0.680 0.981 0.158 4.358 1.264 × 10^5 548. GeV 5.479 × 10^5 2.569 0.962 1.390 0.217 5.139 Muon critical energy 800. GeV 8.001 × 10^5 2.607 1.452 2.096 0.320 6.476 2.012 × 10^5 1.00 TeV 1.000 × 10^6 2.630 1.850 2.669 0.402 7.552 2.298 × 10^5 1.40 TeV 1.400 × 10^6 2.664 2.649 3.813 0.570 9.696 2.764 × 10^5 2.00 TeV 2.000 × 10^6 2.701 3.874 5.561 0.825 12.962 3.298 × 10^5 3.00 TeV 3.000 × 10^6 2.743 5.923 8.469 1.263 18.398 3.942 × 10^5 4.00 TeV 4.000 × 10^6 2.773 8.003 11.411 1.708 23.896 4.418 × 10^5 8.00 TeV 8.000 × 10^6 2.848 16.406 23.251 3.560 46.065 5.603 × 10^5 10.0 TeV 1.000 × 10^7 2.873 20.648 29.208 4.512 57.241 5.991 × 10^5 14.0 TeV 1.400 × 10^7 2.910 29.116 41.084 6.471 79.582 6.581 × 10^5 20.0 TeV 2.000 × 10^7 2.951 41.911 58.983 9.477 113.323 7.210 × 10^5 30.0 TeV 3.000 × 10^7 2.998 63.188 88.779 14.686 169.651 7.927 × 10^5 40.0 TeV 4.000 × 10^7 3.031 84.554 118.660 20.026 226.273 8.435 × 10^5 80.0 TeV 8.000 × 10^7 3.114 170.213 238.272 42.383 453.983 9.659 × 10^5 100. TeV 1.000 × 10^8 3.142 213.142 298.140 53.952 568.376 1.005 × 10^6