Table 245: Muons in Silicon dioxide (fused quartz) (SiO_2)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.49930 2.200 139.2 0.08408 3.5064 0.1500 3.0140 4.0560 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.591 6.591 8.438 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.158 5.158 1.537 × 10^0 20.0 MeV 6.802 × 10^1 4.041 4.041 2.866 × 10^0 30.0 MeV 8.509 × 10^1 3.145 3.145 5.710 × 10^0 40.0 MeV 1.003 × 10^2 2.691 2.691 9.170 × 10^0 80.0 MeV 1.527 × 10^2 2.030 2.030 2.682 × 10^1 100. MeV 1.764 × 10^2 1.908 1.908 3.701 × 10^1 140. MeV 2.218 × 10^2 1.786 1.786 5.878 × 10^1 200. MeV 2.868 × 10^2 1.719 1.719 9.315 × 10^1 288. MeV 3.788 × 10^2 1.699 0.000 1.699 Minimum ionization 300. MeV 3.917 × 10^2 1.699 0.000 1.699 1.518 × 10^2 400. MeV 4.945 × 10^2 1.711 0.000 1.711 2.105 × 10^2 800. MeV 8.995 × 10^2 1.789 0.000 0.000 1.790 4.391 × 10^2 1.00 GeV 1.101 × 10^3 1.823 0.000 0.000 1.824 5.497 × 10^2 1.40 GeV 1.502 × 10^3 1.877 0.001 0.000 0.001 1.879 7.657 × 10^2 2.00 GeV 2.103 × 10^3 1.936 0.001 0.000 0.001 1.939 1.080 × 10^3 3.00 GeV 3.104 × 10^3 2.003 0.001 0.001 0.001 2.007 1.586 × 10^3 4.00 GeV 4.104 × 10^3 2.049 0.002 0.002 0.002 2.055 2.078 × 10^3 8.00 GeV 8.105 × 10^3 2.154 0.005 0.005 0.004 2.168 3.967 × 10^3 10.0 GeV 1.011 × 10^4 2.186 0.007 0.007 0.005 2.204 4.881 × 10^3 14.0 GeV 1.411 × 10^4 2.232 0.010 0.011 0.006 2.259 6.673 × 10^3 20.0 GeV 2.011 × 10^4 2.277 0.016 0.018 0.009 2.321 9.291 × 10^3 30.0 GeV 3.011 × 10^4 2.326 0.026 0.032 0.013 2.398 1.353 × 10^4 40.0 GeV 4.011 × 10^4 2.360 0.037 0.047 0.017 2.461 1.764 × 10^4 80.0 GeV 8.011 × 10^4 2.435 0.083 0.113 0.033 2.665 3.324 × 10^4 100. GeV 1.001 × 10^5 2.459 0.108 0.148 0.041 2.757 4.062 × 10^4 140. GeV 1.401 × 10^5 2.494 0.159 0.222 0.057 2.932 5.468 × 10^4 200. GeV 2.001 × 10^5 2.530 0.239 0.339 0.081 3.190 7.429 × 10^4 300. GeV 3.001 × 10^5 2.572 0.376 0.537 0.122 3.607 1.038 × 10^5 400. GeV 4.001 × 10^5 2.601 0.519 0.744 0.162 4.026 1.300 × 10^5 708. GeV 7.083 × 10^5 2.660 0.971 1.400 0.289 5.321 Muon critical energy 800. GeV 8.001 × 10^5 2.673 1.109 1.599 0.328 5.708 2.130 × 10^5 1.00 TeV 1.000 × 10^6 2.696 1.413 2.038 0.412 6.560 2.457 × 10^5 1.40 TeV 1.400 × 10^6 2.731 2.026 2.914 0.584 8.255 2.999 × 10^5 2.00 TeV 2.000 × 10^6 2.769 2.965 4.255 0.845 10.835 3.632 × 10^5 3.00 TeV 3.000 × 10^6 2.813 4.537 6.485 1.294 15.130 4.409 × 10^5 4.00 TeV 4.000 × 10^6 2.845 6.135 8.744 1.750 19.474 4.991 × 10^5 8.00 TeV 8.000 × 10^6 2.922 12.593 17.837 3.650 37.002 6.456 × 10^5 10.0 TeV 1.000 × 10^7 2.947 15.855 22.413 4.628 45.844 6.941 × 10^5 14.0 TeV 1.400 × 10^7 2.986 22.366 31.535 6.641 63.528 7.679 × 10^5 20.0 TeV 2.000 × 10^7 3.028 32.207 45.288 9.731 90.254 8.467 × 10^5 30.0 TeV 3.000 × 10^7 3.077 48.579 68.177 15.089 134.921 9.368 × 10^5 40.0 TeV 4.000 × 10^7 3.112 65.025 91.135 20.584 179.856 1.001 × 10^6 80.0 TeV 8.000 × 10^7 3.198 130.975 183.039 43.614 360.826 1.155 × 10^6 100. TeV 1.000 × 10^8 3.226 164.033 229.042 55.540 451.842 1.204 × 10^6