Table 244: Muons in Rubber neoprene (C_4H_5Cl)_n

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.51956 1.230 93.0 0.09763 3.3632 0.1501 2.9461 3.7911 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.248 7.248 7.641 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.659 5.660 1.395 × 10^0 20.0 MeV 6.802 × 10^1 4.424 4.424 2.608 × 10^0 30.0 MeV 8.509 × 10^1 3.436 3.436 5.209 × 10^0 40.0 MeV 1.003 × 10^2 2.936 2.936 8.377 × 10^0 80.0 MeV 1.527 × 10^2 2.207 2.207 2.459 × 10^1 100. MeV 1.764 × 10^2 2.070 2.070 3.397 × 10^1 140. MeV 2.218 × 10^2 1.931 1.931 5.407 × 10^1 200. MeV 2.868 × 10^2 1.853 1.853 8.590 × 10^1 300. MeV 3.917 × 10^2 1.826 0.000 1.826 1.404 × 10^2 304. MeV 3.959 × 10^2 1.826 0.000 1.826 Minimum ionization 400. MeV 4.945 × 10^2 1.835 0.000 1.835 1.951 × 10^2 800. MeV 8.995 × 10^2 1.911 0.000 0.000 1.912 4.087 × 10^2 1.00 GeV 1.101 × 10^3 1.946 0.000 0.000 1.946 5.123 × 10^2 1.40 GeV 1.502 × 10^3 2.001 0.000 0.000 0.001 2.002 7.148 × 10^2 2.00 GeV 2.103 × 10^3 2.061 0.001 0.000 0.001 2.063 1.010 × 10^3 3.00 GeV 3.104 × 10^3 2.130 0.001 0.001 0.001 2.133 1.486 × 10^3 4.00 GeV 4.104 × 10^3 2.177 0.002 0.001 0.002 2.183 1.949 × 10^3 8.00 GeV 8.105 × 10^3 2.286 0.005 0.004 0.004 2.299 3.729 × 10^3 10.0 GeV 1.011 × 10^4 2.318 0.006 0.006 0.005 2.336 4.592 × 10^3 14.0 GeV 1.411 × 10^4 2.366 0.009 0.010 0.006 2.392 6.283 × 10^3 20.0 GeV 2.011 × 10^4 2.413 0.015 0.017 0.009 2.454 8.758 × 10^3 30.0 GeV 3.011 × 10^4 2.464 0.024 0.029 0.013 2.531 1.277 × 10^4 40.0 GeV 4.011 × 10^4 2.499 0.034 0.043 0.017 2.593 1.667 × 10^4 80.0 GeV 8.011 × 10^4 2.577 0.077 0.104 0.034 2.792 3.151 × 10^4 100. GeV 1.001 × 10^5 2.602 0.100 0.137 0.042 2.881 3.856 × 10^4 140. GeV 1.401 × 10^5 2.638 0.147 0.206 0.058 3.049 5.205 × 10^4 200. GeV 2.001 × 10^5 2.676 0.221 0.315 0.082 3.294 7.097 × 10^4 300. GeV 3.001 × 10^5 2.719 0.348 0.498 0.123 3.689 9.964 × 10^4 400. GeV 4.001 × 10^5 2.750 0.480 0.690 0.164 4.084 1.254 × 10^5 796. GeV 7.959 × 10^5 2.824 1.022 1.473 0.330 5.648 Muon critical energy 800. GeV 8.001 × 10^5 2.824 1.027 1.481 0.331 5.665 2.082 × 10^5 1.00 TeV 1.000 × 10^6 2.849 1.310 1.889 0.416 6.464 2.412 × 10^5 1.40 TeV 1.400 × 10^6 2.885 1.878 2.701 0.590 8.055 2.966 × 10^5 2.00 TeV 2.000 × 10^6 2.925 2.750 3.945 0.855 10.475 3.617 × 10^5 3.00 TeV 3.000 × 10^6 2.970 4.210 6.015 1.309 14.505 4.425 × 10^5 4.00 TeV 4.000 × 10^6 3.003 5.693 8.111 1.772 18.580 5.033 × 10^5 8.00 TeV 8.000 × 10^6 3.084 11.694 16.551 3.696 35.026 6.575 × 10^5 10.0 TeV 1.000 × 10^7 3.110 14.726 20.800 4.687 43.324 7.088 × 10^5 14.0 TeV 1.400 × 10^7 3.151 20.778 29.267 6.728 59.924 7.870 × 10^5 20.0 TeV 2.000 × 10^7 3.194 29.928 42.034 9.862 85.019 8.706 × 10^5 30.0 TeV 3.000 × 10^7 3.245 45.152 63.281 15.299 126.977 9.662 × 10^5 40.0 TeV 4.000 × 10^7 3.281 60.447 84.593 20.878 169.199 1.034 × 10^6 80.0 TeV 8.000 × 10^7 3.371 121.766 169.907 44.274 339.317 1.198 × 10^6 100. TeV 1.000 × 10^8 3.400 152.498 212.611 56.396 424.905 1.251 × 10^6