Table 222: Muons in Polyethylene terephthalate (Mylar) (C_{10}H_8O_4)_n

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.52037 1.400 78.7 0.12679 3.3076 0.1562 2.6507 3.3262 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.420 7.420 7.451 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.789 5.789 1.362 × 10^0 20.0 MeV 6.802 × 10^1 4.522 4.522 2.548 × 10^0 30.0 MeV 8.509 × 10^1 3.509 3.509 5.093 × 10^0 40.0 MeV 1.003 × 10^2 2.997 2.997 8.197 × 10^0 80.0 MeV 1.527 × 10^2 2.250 2.250 2.409 × 10^1 100. MeV 1.764 × 10^2 2.108 2.108 3.329 × 10^1 140. MeV 2.218 × 10^2 1.963 1.964 5.305 × 10^1 200. MeV 2.868 × 10^2 1.880 1.880 8.440 × 10^1 300. MeV 3.917 × 10^2 1.849 0.000 1.849 1.382 × 10^2 317. MeV 4.096 × 10^2 1.848 0.000 1.849 Minimum ionization 400. MeV 4.945 × 10^2 1.855 0.000 1.855 1.922 × 10^2 800. MeV 8.995 × 10^2 1.926 0.000 0.000 1.926 4.039 × 10^2 1.00 GeV 1.101 × 10^3 1.958 0.000 0.000 1.959 5.069 × 10^2 1.40 GeV 1.502 × 10^3 2.010 0.000 0.001 2.011 7.083 × 10^2 2.00 GeV 2.103 × 10^3 2.068 0.001 0.000 0.001 2.070 1.002 × 10^3 3.00 GeV 3.104 × 10^3 2.134 0.001 0.001 0.001 2.137 1.477 × 10^3 4.00 GeV 4.104 × 10^3 2.180 0.001 0.001 0.002 2.184 1.940 × 10^3 8.00 GeV 8.105 × 10^3 2.284 0.003 0.003 0.004 2.294 3.721 × 10^3 10.0 GeV 1.011 × 10^4 2.316 0.004 0.004 0.005 2.329 4.586 × 10^3 14.0 GeV 1.411 × 10^4 2.362 0.007 0.007 0.007 2.382 6.283 × 10^3 20.0 GeV 2.011 × 10^4 2.408 0.010 0.012 0.009 2.439 8.770 × 10^3 30.0 GeV 3.011 × 10^4 2.458 0.017 0.020 0.013 2.509 1.281 × 10^4 40.0 GeV 4.011 × 10^4 2.492 0.024 0.030 0.018 2.564 1.675 × 10^4 80.0 GeV 8.011 × 10^4 2.571 0.054 0.073 0.034 2.732 3.184 × 10^4 100. GeV 1.001 × 10^5 2.595 0.070 0.096 0.042 2.804 3.906 × 10^4 140. GeV 1.401 × 10^5 2.632 0.104 0.144 0.059 2.939 5.299 × 10^4 200. GeV 2.001 × 10^5 2.670 0.156 0.221 0.084 3.131 7.276 × 10^4 300. GeV 3.001 × 10^5 2.713 0.246 0.351 0.125 3.436 1.032 × 10^5 400. GeV 4.001 × 10^5 2.744 0.340 0.487 0.167 3.738 1.311 × 10^5 800. GeV 8.001 × 10^5 2.818 0.731 1.052 0.337 4.939 2.239 × 10^5 1.00 TeV 1.000 × 10^6 2.843 0.932 1.345 0.424 5.544 2.621 × 10^5 1.05 TeV 1.051 × 10^6 2.848 0.984 1.418 0.446 5.696 Muon critical energy 1.40 TeV 1.400 × 10^6 2.879 1.339 1.926 0.601 6.746 3.274 × 10^5 2.00 TeV 2.000 × 10^6 2.919 1.964 2.818 0.871 8.572 4.062 × 10^5 3.00 TeV 3.000 × 10^6 2.965 3.011 4.303 1.334 11.612 5.061 × 10^5 4.00 TeV 4.000 × 10^6 2.997 4.076 5.809 1.806 14.688 5.825 × 10^5 8.00 TeV 8.000 × 10^6 3.078 8.390 11.874 3.769 27.112 7.799 × 10^5 10.0 TeV 1.000 × 10^7 3.105 10.572 14.929 4.781 33.387 8.463 × 10^5 14.0 TeV 1.400 × 10^7 3.145 14.925 21.017 6.865 45.952 9.480 × 10^5 20.0 TeV 2.000 × 10^7 3.189 21.511 30.199 10.067 64.966 1.057 × 10^6 30.0 TeV 3.000 × 10^7 3.239 32.477 45.477 15.625 96.818 1.183 × 10^6 40.0 TeV 4.000 × 10^7 3.276 43.502 60.804 21.330 128.912 1.272 × 10^6 80.0 TeV 8.000 × 10^7 3.365 87.697 122.167 45.272 258.501 1.487 × 10^6 100. TeV 1.000 × 10^8 3.395 109.848 152.885 57.684 323.812 1.556 × 10^6