Table 147: Muons in Dichlorodiethyl ether C_4Cl_2H_8O

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.51744 1.220 103.3 0.06799 3.5250 0.1773 3.1586 4.0135 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.117 7.117 7.789 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.561 5.561 1.421 × 10^0 20.0 MeV 6.802 × 10^1 4.349 4.349 2.655 × 10^0 30.0 MeV 8.509 × 10^1 3.380 3.380 5.300 × 10^0 40.0 MeV 1.003 × 10^2 2.889 2.889 8.521 × 10^0 80.0 MeV 1.527 × 10^2 2.174 2.174 2.499 × 10^1 100. MeV 1.764 × 10^2 2.042 2.042 3.450 × 10^1 140. MeV 2.218 × 10^2 1.907 1.907 5.486 × 10^1 200. MeV 2.868 × 10^2 1.832 1.832 8.708 × 10^1 298. MeV 3.894 × 10^2 1.807 0.000 1.807 Minimum ionization 300. MeV 3.917 × 10^2 1.807 0.000 1.807 1.422 × 10^2 400. MeV 4.945 × 10^2 1.817 0.000 1.817 1.974 × 10^2 800. MeV 8.995 × 10^2 1.895 0.000 0.000 1.896 4.129 × 10^2 1.00 GeV 1.101 × 10^3 1.930 0.000 0.000 1.931 5.174 × 10^2 1.40 GeV 1.502 × 10^3 1.986 0.001 0.000 0.001 1.987 7.215 × 10^2 2.00 GeV 2.103 × 10^3 2.047 0.001 0.000 0.001 2.049 1.019 × 10^3 3.00 GeV 3.104 × 10^3 2.116 0.001 0.001 0.001 2.120 1.498 × 10^3 4.00 GeV 4.104 × 10^3 2.165 0.002 0.002 0.002 2.170 1.964 × 10^3 8.00 GeV 8.105 × 10^3 2.274 0.005 0.005 0.004 2.288 3.753 × 10^3 10.0 GeV 1.011 × 10^4 2.307 0.007 0.007 0.005 2.326 4.619 × 10^3 14.0 GeV 1.411 × 10^4 2.355 0.010 0.011 0.006 2.383 6.317 × 10^3 20.0 GeV 2.011 × 10^4 2.403 0.016 0.019 0.009 2.447 8.800 × 10^3 30.0 GeV 3.011 × 10^4 2.454 0.027 0.033 0.013 2.527 1.282 × 10^4 40.0 GeV 4.011 × 10^4 2.489 0.038 0.048 0.017 2.592 1.672 × 10^4 80.0 GeV 8.011 × 10^4 2.568 0.085 0.115 0.033 2.802 3.154 × 10^4 100. GeV 1.001 × 10^5 2.592 0.110 0.152 0.041 2.896 3.856 × 10^4 140. GeV 1.401 × 10^5 2.628 0.163 0.228 0.057 3.077 5.196 × 10^4 200. GeV 2.001 × 10^5 2.666 0.244 0.348 0.081 3.341 7.067 × 10^4 300. GeV 3.001 × 10^5 2.709 0.385 0.551 0.122 3.768 9.883 × 10^4 400. GeV 4.001 × 10^5 2.740 0.530 0.762 0.163 4.195 1.240 × 10^5 730. GeV 7.297 × 10^5 2.804 1.026 1.479 0.299 5.608 Muon critical energy 800. GeV 8.001 × 10^5 2.814 1.134 1.635 0.329 5.912 2.039 × 10^5 1.00 TeV 1.000 × 10^6 2.838 1.445 2.084 0.413 6.781 2.355 × 10^5 1.40 TeV 1.400 × 10^6 2.875 2.072 2.980 0.586 8.512 2.880 × 10^5 2.00 TeV 2.000 × 10^6 2.914 3.032 4.350 0.848 11.145 3.495 × 10^5 3.00 TeV 3.000 × 10^6 2.959 4.640 6.630 1.299 15.529 4.252 × 10^5 4.00 TeV 4.000 × 10^6 2.992 6.274 8.939 1.757 19.963 4.818 × 10^5 8.00 TeV 8.000 × 10^6 3.072 12.880 18.232 3.665 37.850 6.249 × 10^5 10.0 TeV 1.000 × 10^7 3.099 16.217 22.909 4.647 46.873 6.723 × 10^5 14.0 TeV 1.400 × 10^7 3.139 22.879 32.231 6.670 64.919 7.445 × 10^5 20.0 TeV 2.000 × 10^7 3.182 32.949 46.286 9.775 92.192 8.217 × 10^5 30.0 TeV 3.000 × 10^7 3.232 49.700 69.678 15.160 137.771 9.099 × 10^5 40.0 TeV 4.000 × 10^7 3.269 66.529 93.140 20.685 183.623 9.725 × 10^5 80.0 TeV 8.000 × 10^7 3.358 134.000 187.059 43.847 368.264 1.123 × 10^6 100. TeV 1.000 × 10^8 3.387 167.818 234.069 55.844 461.119 1.172 × 10^6