Table 129: Muons in Calcium carbonate (CaCO_3)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.49955 2.800 136.4 0.08301 3.4120 0.0492 3.0549 3.7738 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.613 6.613 8.408 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.175 5.175 1.532 × 10^0 20.0 MeV 6.802 × 10^1 4.053 4.054 2.857 × 10^0 30.0 MeV 8.509 × 10^1 3.154 3.154 5.692 × 10^0 40.0 MeV 1.003 × 10^2 2.699 2.699 9.141 × 10^0 80.0 MeV 1.527 × 10^2 2.027 2.027 2.677 × 10^1 100. MeV 1.764 × 10^2 1.903 1.903 3.698 × 10^1 140. MeV 2.218 × 10^2 1.778 1.778 5.883 × 10^1 200. MeV 2.868 × 10^2 1.708 1.708 9.339 × 10^1 297. MeV 3.884 × 10^2 1.686 0.000 1.686 Minimum ionization 300. MeV 3.917 × 10^2 1.686 0.000 1.686 1.525 × 10^2 400. MeV 4.945 × 10^2 1.697 0.000 1.697 2.116 × 10^2 800. MeV 8.995 × 10^2 1.773 0.000 0.000 1.773 4.422 × 10^2 1.00 GeV 1.101 × 10^3 1.806 0.000 0.000 1.807 5.539 × 10^2 1.40 GeV 1.502 × 10^3 1.859 0.001 0.000 0.001 1.861 7.719 × 10^2 2.00 GeV 2.103 × 10^3 1.918 0.001 0.000 0.001 1.920 1.089 × 10^3 3.00 GeV 3.104 × 10^3 1.985 0.002 0.001 0.001 1.989 1.600 × 10^3 4.00 GeV 4.104 × 10^3 2.031 0.002 0.002 0.002 2.037 2.097 × 10^3 8.00 GeV 8.105 × 10^3 2.136 0.006 0.006 0.004 2.151 4.001 × 10^3 10.0 GeV 1.011 × 10^4 2.168 0.008 0.008 0.005 2.188 4.923 × 10^3 14.0 GeV 1.411 × 10^4 2.213 0.012 0.013 0.006 2.244 6.727 × 10^3 20.0 GeV 2.011 × 10^4 2.259 0.018 0.021 0.009 2.308 9.361 × 10^3 30.0 GeV 3.011 × 10^4 2.309 0.030 0.036 0.013 2.388 1.362 × 10^4 40.0 GeV 4.011 × 10^4 2.342 0.042 0.053 0.017 2.455 1.775 × 10^4 80.0 GeV 8.011 × 10^4 2.418 0.095 0.129 0.033 2.675 3.333 × 10^4 100. GeV 1.001 × 10^5 2.442 0.123 0.169 0.041 2.775 4.067 × 10^4 140. GeV 1.401 × 10^5 2.476 0.181 0.253 0.057 2.968 5.460 × 10^4 200. GeV 2.001 × 10^5 2.513 0.272 0.387 0.081 3.253 7.390 × 10^4 300. GeV 3.001 × 10^5 2.555 0.428 0.612 0.121 3.716 1.026 × 10^5 400. GeV 4.001 × 10^5 2.584 0.589 0.846 0.161 4.181 1.280 × 10^5 631. GeV 6.316 × 10^5 2.631 0.973 1.402 0.256 5.262 Muon critical energy 800. GeV 8.001 × 10^5 2.656 1.259 1.813 0.326 6.054 2.071 × 10^5 1.00 TeV 1.000 × 10^6 2.679 1.604 2.311 0.410 7.004 2.378 × 10^5 1.40 TeV 1.400 × 10^6 2.714 2.298 3.302 0.581 8.895 2.883 × 10^5 2.00 TeV 2.000 × 10^6 2.752 3.362 4.819 0.841 11.774 3.468 × 10^5 3.00 TeV 3.000 × 10^6 2.796 5.142 7.342 1.287 16.567 4.181 × 10^5 4.00 TeV 4.000 × 10^6 2.827 6.949 9.896 1.742 21.415 4.710 × 10^5 8.00 TeV 8.000 × 10^6 2.905 14.255 20.176 3.631 40.968 6.038 × 10^5 10.0 TeV 1.000 × 10^7 2.930 17.944 25.349 4.603 50.828 6.475 × 10^5 14.0 TeV 1.400 × 10^7 2.969 25.307 35.664 6.605 70.545 7.140 × 10^5 20.0 TeV 2.000 × 10^7 3.011 36.434 51.213 9.678 100.336 7.850 × 10^5 30.0 TeV 3.000 × 10^7 3.060 54.944 77.086 15.005 150.094 8.660 × 10^5 40.0 TeV 4.000 × 10^7 3.095 73.535 103.033 20.468 200.132 9.235 × 10^5 80.0 TeV 8.000 × 10^7 3.181 148.069 206.906 43.362 401.518 1.062 × 10^6 100. TeV 1.000 × 10^8 3.209 185.424 258.899 55.217 502.749 1.106 × 10^6